\hypertarget{structtesting_1_1internal_1_1_is_same}{}\section{testing\+:\+:internal\+:\+:Is\+Same$<$ T, U $>$ Struct Template Reference}
\label{structtesting_1_1internal_1_1_is_same}\index{testing\+::internal\+::\+Is\+Same$<$ T, U $>$@{testing\+::internal\+::\+Is\+Same$<$ T, U $>$}}


{\ttfamily \#include $<$gtest.\+h$>$}

\subsection*{Public Types}
\begin{DoxyCompactItemize}
\item 
enum \{ \mbox{\hyperlink{structtesting_1_1internal_1_1_is_same_a4dfd313ccff08905c7c36f990ab52e1ca58968a8c680eff4326a25fab55aa0a5e}{value}} = false
 \}
\end{DoxyCompactItemize}


\subsection{Detailed Description}
\subsubsection*{template$<$typename T, typename U$>$\newline
struct testing\+::internal\+::\+Is\+Same$<$ T, U $>$}



Definition at line 1101 of file gtest.\+h.



\subsection{Member Enumeration Documentation}
\mbox{\Hypertarget{structtesting_1_1internal_1_1_is_same_a4dfd313ccff08905c7c36f990ab52e1c}\label{structtesting_1_1internal_1_1_is_same_a4dfd313ccff08905c7c36f990ab52e1c}} 
\subsubsection{\texorpdfstring{anonymous enum}{anonymous enum}}
{\footnotesize\ttfamily template$<$typename T , typename U $>$ \\
anonymous enum}

\begin{DoxyEnumFields}{Enumerator}
\raisebox{\heightof{T}}[0pt][0pt]{\index{value@{value}!testing\+::internal\+::\+Is\+Same@{testing\+::internal\+::\+Is\+Same}}\index{testing\+::internal\+::\+Is\+Same@{testing\+::internal\+::\+Is\+Same}!value@{value}}}\mbox{\Hypertarget{structtesting_1_1internal_1_1_is_same_a4dfd313ccff08905c7c36f990ab52e1ca58968a8c680eff4326a25fab55aa0a5e}\label{structtesting_1_1internal_1_1_is_same_a4dfd313ccff08905c7c36f990ab52e1ca58968a8c680eff4326a25fab55aa0a5e}} 
value&\\
\hline

\end{DoxyEnumFields}


Definition at line 1102 of file gtest.\+h.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
test/eclipse-\/cygwin/lib/gtest/\mbox{\hyperlink{gtest_8h}{gtest.\+h}}\end{DoxyCompactItemize}
