\hypertarget{structutl_1_1common__impl_1_1common__reference}{}\section{utl\+:\+:common\+\_\+impl\+:\+:common\+\_\+reference$<$... $>$ Struct Template Reference}
\label{structutl_1_1common__impl_1_1common__reference}\index{utl\+::common\+\_\+impl\+::common\+\_\+reference$<$... $>$@{utl\+::common\+\_\+impl\+::common\+\_\+reference$<$... $>$}}


{\ttfamily \#include $<$stl.\+h$>$}



\subsection{Detailed Description}
\subsubsection*{template$<$class...$>$\newline
struct utl\+::common\+\_\+impl\+::common\+\_\+reference$<$... $>$}



Definition at line 222 of file stl.\+h.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
include/utl/concepts/\mbox{\hyperlink{stl_8h}{stl.\+h}}\end{DoxyCompactItemize}
