\hypertarget{structutl_1_1meta_1_1nil__}{}\section{utl\+:\+:meta\+:\+:nil\+\_\+ Struct Reference}
\label{structutl_1_1meta_1_1nil__}\index{utl\+::meta\+::nil\+\_\+@{utl\+::meta\+::nil\+\_\+}}


{\ttfamily \#include $<$integral.\+h$>$}

\subsection*{Public Types}
\begin{DoxyCompactItemize}
\item 
using \mbox{\hyperlink{structutl_1_1meta_1_1nil___a497da8469a94140b0285ba5864d794c8}{type}} = \mbox{\hyperlink{structutl_1_1meta_1_1nil__}{nil\+\_\+}}
\end{DoxyCompactItemize}


\subsection{Detailed Description}
Empty type \mbox{\hyperlink{namespaceutl_1_1meta}{utl\+::meta}}\textquotesingle{}s nil type is not pure nil. It\textquotesingle{}s a recursive "de-\/referencable nil. Each time someone applies \+::type to it, he gets back \mbox{\hyperlink{structutl_1_1meta_1_1nil__}{nil\+\_\+}}. This way we can prevent a lot of compilation errors in a wrong meta\+:\+: handling. 

Definition at line 43 of file integral.\+h.



\subsection{Member Typedef Documentation}
\mbox{\Hypertarget{structutl_1_1meta_1_1nil___a497da8469a94140b0285ba5864d794c8}\label{structutl_1_1meta_1_1nil___a497da8469a94140b0285ba5864d794c8}} 
\index{utl\+::meta\+::nil\+\_\+@{utl\+::meta\+::nil\+\_\+}!type@{type}}
\index{type@{type}!utl\+::meta\+::nil\+\_\+@{utl\+::meta\+::nil\+\_\+}}
\subsubsection{\texorpdfstring{type}{type}}
{\footnotesize\ttfamily using \mbox{\hyperlink{structutl_1_1meta_1_1nil___a497da8469a94140b0285ba5864d794c8}{utl\+::meta\+::nil\+\_\+\+::type}} =  \mbox{\hyperlink{structutl_1_1meta_1_1nil__}{nil\+\_\+}}}



Definition at line 44 of file integral.\+h.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
include/utl/meta/\mbox{\hyperlink{integral_8h}{integral.\+h}}\end{DoxyCompactItemize}
